  G

  G

  C

  C

  C

A

 A

 G

G

 C

 U

C

 G

 G

 G

 C

 C G
     G
     C
     C
     C

       A

     A
     G

       G

     C
     U

       C

     G
     G
     G
     C
     C

 ENERGY = -33.0  Tloop_microhelix_GGC...