              G

            U

          C

        C

      C

    U

 C

U
  G A G
         G G A
               C

                     C C

                         A G
                              G

                              A
                             C
                          A

                       G
                     G

                    AG
                   A

ENERGY = -14.3   MEG3_ hsa-mir-6875-5p