          A

        G

      C
   U

 C

A

  A U
       G

         10

         U

                 G

                         U U

                                           C

                                                  U

                                                      U

                                                        C

                                                      U

                                                U

                                           20

                                         G

  ENERGY = 89.4  02/12/26 10:57:00