        U

     U

   G

 U

A

A

 U

  U

    C

       U

          G U U U
                       G
                          U
                            G
                             U
                              C

                                     20

                              U
                             G C
                                 G U A
                                       U
                                      U
                                   G

                                 U

                            30

                               C

                             G

                           U

ENERGY = 92.9  sRNA73