                                     1

 1

                                     10

    10

                                     20

        20

                                     30

             30

                                     40

                 40

                                     50

                      50

                                     60

                          60

                                     77

                                  77

0.218752 <= -log10(Probability) <  0.575001
0.575001 <= -log10(Probability) <  0.931251
0.931251 <= -log10(Probability) <  1.2875
1.2875 <= -log10(Probability) <  1.64375
1.64375 <= -log10(Probability) <= 2
partition.pfs