            1

  1

            18

         18

0.00147721 <= -log10(Probability) <  0.401182
0.401182 <= -log10(Probability) <  0.800886
0.800886 <= -log10(Probability) <  1.20059
1.20059 <= -log10(Probability) <  1.6003
1.6003 <= -log10(Probability) <= 2
partition.pfs