                            1

 1

                            10

     10

                            20

         20

                            30

             30

                            40

                  40

                            56

                         56

0.00185671 <= -log10(Probability) <  0.401485
0.401485 <= -log10(Probability) <  0.801114
0.801114 <= -log10(Probability) <  1.20074
1.20074 <= -log10(Probability) <  1.60037
1.60037 <= -log10(Probability) <= 2
partition.pfs