              1

  1

              10

     10

              21

          21

0.140081 <= -log10(Probability) <  0.512065
0.512065 <= -log10(Probability) <  0.884048
0.884048 <= -log10(Probability) <  1.25603
1.25603 <= -log10(Probability) <  1.62802
1.62802 <= -log10(Probability) <= 2
partition.pfs