                                   1

 1

                                   10

    10

                                   20

         20

                                   30

             30

                                   40

                 40

                                   50

                      50

                                   60

                          60

                                   73

                                73

0.00194812 <= -log10(Probability) <  0.401558
0.401558 <= -log10(Probability) <  0.801169
0.801169 <= -log10(Probability) <  1.20078
1.20078 <= -log10(Probability) <  1.60039
1.60039 <= -log10(Probability) <= 2
partition.pfs