                                   1

 1

                                   10

    10

                                   20

         20

                                   30

             30

                                   40

                 40

                                   50

                      50

                                   60

                          60

                                   72

                                72

0.00139617 <= -log10(Probability) <  0.401117
0.401117 <= -log10(Probability) <  0.800838
0.800838 <= -log10(Probability) <  1.20056
1.20056 <= -log10(Probability) <  1.60028
1.60028 <= -log10(Probability) <= 2
partition.pfs