                                    1

 1

                                    10

    10

                                    20

        20

                                    30

             30

                                    40

                 40

                                    50

                      50

                                    60

                          60

                                    75

                                 75

0.131046 <= -log10(Probability) <  0.504836
0.504836 <= -log10(Probability) <  0.878627
0.878627 <= -log10(Probability) <  1.25242
1.25242 <= -log10(Probability) <  1.62621
1.62621 <= -log10(Probability) <= 2
partition.pfs