         1

   1

         10

      10

0.00325133 <= -log10(Probability) <  0.00754708
0.00754708 <= -log10(Probability) <  0.0118428
0.0118428 <= -log10(Probability) <  0.0161386
0.0161386 <= -log10(Probability) <  0.0204343
0.0204343 <= -log10(Probability) <= 0.0247301
partition.pfs