             1

  1

             19

          19

0.00132056 <= -log10(Probability) <  0.401056
0.401056 <= -log10(Probability) <  0.800792
0.800792 <= -log10(Probability) <  1.20053
1.20053 <= -log10(Probability) <  1.60026
1.60026 <= -log10(Probability) <= 2
partition.pfs