                          1

  1

                          10

     10

                          20

         20

                          30

              30

                          40

                  40

                          51

                       51

0.00135275 <= -log10(Probability) <  0.401082
0.401082 <= -log10(Probability) <  0.800812
0.800812 <= -log10(Probability) <  1.20054
1.20054 <= -log10(Probability) <  1.60027
1.60027 <= -log10(Probability) <= 2
partition.pfs