                                    1

 1

                                    10

    10

                                    20

        20

                                    30

             30

                                    40

                 40

                                    50

                      50

                                    60

                          60

                                    75

                                 75

0.152557 <= -log10(Probability) <  0.522046
0.522046 <= -log10(Probability) <  0.891534
0.891534 <= -log10(Probability) <  1.26102
1.26102 <= -log10(Probability) <  1.63051
1.63051 <= -log10(Probability) <= 2
partition.pfs