      C

       U

          G

          C

         U

          G

          C

         U

          G

  10 C

         U

          G

          C

         U

           G C
               U
              G
              C
                       20

               U
              G
              C
               U
              G
              C
                U
              G
              C
               U

                  30

             G

ENERGY = -10.1  Myotonic dystrophy rCUG