   A

      U

      C

       A

       C

       A

       U

       U

       G

     C

   C

 A

G

G

 G

  A

    U

       U U C C

                    T
                   T
                  A
                A
             A
           T
           A
           A
           T
          G
          T
          G
          A

ENERGY = -7.6   hsa-miR-23a-3p_  GSK3B