              C

            U

           G

           C

             U

               G

              C

           U

          G

  10

         C

      U

      G

        C
           U

            G
             C
                U

                 G
                  C
                                   20

                             U

                              G C U

                                    G

                                    C
                                 U

                               G

                             C
                          U

                         30

                        G

ENERGY = -6.2  CUG10